Substitute halocarbons

NOAA/CMDL Flask Sampling Network

0

20

40

60

80

100

120

140

160

180

1985 1990 1995 2000

ppt

HCFC-22

0

5

10

15

20

25

1985 1990 1995 2000

ALT

B R W

N W R

MLO

KUM

SMO

CGO

SPO

Air Archive

HFC-134a

0

5

10

15

20

1985 1990 1995 2000

HCFC-141b

0

5

10

15

20

1985 1990 1995 2000

HCFC-142b

Montzka et al., NOAA/CMDL 2001